<template>
  <j-modal
    :title="title"
    :width="width"
    :visible="visible"
    :confirmLoading="confirmLoading"
    :maskClosable="false"
    :keyboard="false"
    :forceRender="true"
    switchFullscreen
    @ok="handleOk"
    @cancel="handleCancel"
    wrapClassName="ant-modal-cust-warp"
    style="top:5%;height: 100%;overflow-y: hidden">
    <a-spin :spinning="confirmLoading">
      <a-form :form="form">
        <a-row class="form-row" :gutter="24">
          <a-col :lg="6" :md="12" :sm="24">
            <a-form-item :labelCol="labelCol" :wrapperCol="wrapperCol" label="供应商">
              <a-select placeholder="选择供应商" v-decorator="[ 'organId', validatorRules.organId ]"
                :dropdownMatchSelectWidth="false" showSearch optionFilterProp="children">
                <div slot="dropdownRender" slot-scope="menu">
                  <v-nodes :vnodes="menu" />
                  <a-divider style="margin: 4px 0;" />
                  <div style="padding: 4px 8px; cursor: pointer;"
                       @mousedown="e => e.preventDefault()" @click="addSupplier"><a-icon type="plus" /> 新增供应商</div>
                </div>
                <a-select-option v-for="(item,index) in supList" :key="index" :value="item.id">
                  {{ item.supplier }}
                </a-select-option>
              </a-select>
            </a-form-item>
          </a-col>
          <a-col :lg="6" :md="12" :sm="24">
            <a-form-item :labelCol="labelCol" :wrapperCol="wrapperCol" label="财务人员">
              <a-select placeholder="选择财务人员" v-decorator="[ 'handsPersonId', validatorRules.handsPersonId ]"
                :dropdownMatchSelectWidth="false" showSearch optionFilterProp="children">
                <a-select-option v-for="(item,index) in personList" :key="index" :value="item.id">
                  {{ item.name }}
                </a-select-option>
              </a-select>
            </a-form-item>
          </a-col>
          <a-col :lg="6" :md="12" :sm="24">
            <a-form-item :labelCol="labelCol" :wrapperCol="wrapperCol" label="单据日期">
              <j-date v-decorator="['billTime', validatorRules.billTime]" :show-time="true"/>
            </a-form-item>
          </a-col>
          <a-col :lg="6" :md="12" :sm="24">
            <a-form-item :labelCol="labelCol" :wrapperCol="wrapperCol" label="单据编号">
              <a-input placeholder="请输入单据编号" v-decorator.trim="[ 'billNo' ]" :readOnly="true"/>
            </a-form-item>
          </a-col>
        </a-row>
        <a-row class="form-row" :gutter="24">
          <a-col :lg="6" :md="12" :sm="24">
            <!-- 操作按钮 -->
            <div class="action-button">
              <a-button type="primary" icon="plus" @click="handleClickAdd">新增</a-button>
              <span class="gap"></span>
              <a-button type="primary" icon="minus" @click="handleClear">清空</a-button>
            </div>
          </a-col>
        </a-row>
        <a-row class="form-row" :gutter="24">
          <a-col :span="24">
            <j-editable-table
              :ref="refKeys[0]"
              :loading="accountTable.loading"
              :columns="accountTable.columns"
              :dataSource="accountTable.dataSource"
              :maxHeight="300"
              :rowNumber="false"
              :rowSelection="false"
              :actionButton="false"
              @valueChange="onValueChange" />
          </a-col>
        </a-row>
        <a-row class="form-row" :gutter="24">
          <a-col :lg="24" :md="24" :sm="24">
            <a-form-item :labelCol="labelCol" :wrapperCol="{xs: { span: 24 },sm: { span: 24 }}" label="">
              <a-textarea :rows="2" placeholder="请输入备注" v-decorator="[ 'remark' ]" style="margin-top:8px;"/>
            </a-form-item>
          </a-col>
        </a-row>
        <a-row class="form-row" :gutter="24">
          <a-col :lg="6" :md="12" :sm="24">
            <a-form-item :labelCol="labelCol" :wrapperCol="wrapperCol" label="付款账户">
              <a-select placeholder="选择付款账户" v-decorator="[ 'accountId', validatorRules.accountId ]"
                :dropdownMatchSelectWidth="false" showSearch optionFilterProp="children">
                <a-select-option v-for="(item,index) in accountList" :key="index" :value="item.id">
                  {{ item.name }}
                </a-select-option>
              </a-select>
            </a-form-item>
          </a-col>
          <a-col :lg="6" :md="12" :sm="24">
            <a-form-item :labelCol="labelCol" :wrapperCol="wrapperCol" label="合计付款">
              <a-input placeholder="请输入合计付款" v-decorator.trim="[ 'totalPrice' ]" :readOnly="true"/>
            </a-form-item>
          </a-col>
          <a-col :lg="6" :md="12" :sm="24">
            <a-form-item :labelCol="labelCol" :wrapperCol="wrapperCol" label="优惠金额">
              <a-input placeholder="请输入优惠金额" v-decorator.trim="[ 'discountMoney', validatorRules.discountMoney ]" @keyup="onKeyUpDiscountMoney" />
            </a-form-item>
          </a-col>
          <a-col :lg="6" :md="12" :sm="24">
            <a-form-item :labelCol="labelCol" :wrapperCol="wrapperCol" label="实际付款">
              <a-input placeholder="请输入实际付款" v-decorator.trim="[ 'changeAmount' ]" :readOnly="true"/>
            </a-form-item>
          </a-col>
        </a-row>
        <a-row class="form-row" :gutter="24">
          <a-col :lg="6" :md="12" :sm="24">
            <a-form-item :labelCol="labelCol" :wrapperCol="wrapperCol" label="附件">
              <j-upload v-model="fileList" bizPath="financial"></j-upload>
            </a-form-item>
          </a-col>
        </a-row>
      </a-form>
    </a-spin>
    <debt-bill-list ref="debtBillList" @ok="debtBillListOk"></debt-bill-list>
    <vendor-modal ref="vendorModalForm" @ok="vendorModalFormOk"></vendor-modal>
  </j-modal>
</template>
<script>
  import pick from 'lodash.pick'
  import DebtBillList from '../dialog/DebtBillList'
  import VendorModal from '../../system/modules/VendorModal'
  import { FormTypes } from '@/utils/JEditableTableUtil'
  import { JEditableTableMixin } from '@/mixins/JEditableTableMixin'
  import { FinancialModalMixin } from '../mixins/FinancialModalMixin'
  import JUpload from '@/components/jeecg/JUpload'
  import JDate from '@/components/jeecg/JDate'
  export default {
    name: "MoneyInModal",
    mixins: [JEditableTableMixin, FinancialModalMixin],
    components: {
      DebtBillList,
      VendorModal,
      JUpload,
      JDate,
      VNodes: {
        functional: true,
        render: (h, ctx) => ctx.props.vnodes,
      }
    },
    data () {
      return {
        title:"操作",
        width: '1600px',
        moreStatus: false,
        // 新增时子表默认添加几行空数据
        addDefaultRowNum: 0,
        visible: false,
        model: {},
        fileList:[],
        labelCol: {
          xs: { span: 24 },
          sm: { span: 8 },
        },
        wrapperCol: {
          xs: { span: 24 },
          sm: { span: 16 },
        },
        refKeys: ['accountDataTable', ],
        activeKey: 'accountDataTable',
        accountTable: {
          loading: false,
          dataSource: [],
          columns: [
            { title: '采购单据编号',key: 'billNumber',width: '20%', type: FormTypes.input, readonly: true },
            { title: '应付欠款',key: 'needDebt', width: '10%', type: FormTypes.inputNumber, statistics: true, readonly: true },
            { title: '已付欠款', key: 'finishDebt', width: '10%', type: FormTypes.inputNumber, statistics: true, readonly: true },
            { title: '本次付款',key: 'eachAmount', width: '10%', type: FormTypes.inputNumber, statistics: true, placeholder: '请输入${title}',
              validateRules: [{ required: true, message: '${title}不能为空' }]
            },
            { title: '备注',key: 'remark', width: '20%', type: FormTypes.input, placeholder: '请输入${title}'}
          ]
        },
        confirmLoading: false,
        validatorRules:{
          organId:{
            rules: [{ required: true, message: '请选择供应商!' }]
          },
          handsPersonId:{
            rules: [{ required: true, message: '请选择财务人员!' }]
          },
          billTime:{
            rules: [{ required: true, message: '请选择单据日期!' }]
          },
          accountId:{
            rules: [{ required: true, message: '请选择付款账户!' }]
          },
          discountMoney:{
            rules: [{ required: true, message: '请输入优惠金额!' }]
          },
          changeAmount:{
            rules: [{ required: true, message: '请输入收款金额!' }]
          }
        },
        url: {
          add: '/accountHead/addAccountHeadAndDetail',
          edit: '/accountHead/updateAccountHeadAndDetail',
          detailList: '/accountItem/getDetailList'
        }
      }
    },
    created () {
    },
    methods: {
      //调用完edit()方法之后会自动调用此方法
      editAfter() {
        if (this.action === 'add') {
          this.addInit("FK")
          this.fileList = []
        } else {
          this.model.billTime = this.model.billTimeStr
          this.$nextTick(() => {
            this.form.setFieldsValue(pick(this.model,'organId', 'handsPersonId', 'billTime', 'billNo', 'remark',
                  'accountId', 'totalPrice', 'discountMoney', 'changeAmount'))
          });
          this.fileList = this.model.fileName
          // 加载子表数据
          let params = {
            headerId: this.model.id
          }
          let url = this.readOnly ? this.url.detailList : this.url.detailList;
          this.requestSubTableData(url, params, this.accountTable);
        }
        this.initSupplier()
        this.initPerson()
        this.initAccount()
      },
      //提交单据时整理成formData
      classifyIntoFormData(allValues) {
        let totalPrice = 0
        let billMain = Object.assign(this.model, allValues.formValue)
        let detailArr = allValues.tablesValue[0].values
        billMain.type = '付款'
        for(let item of detailArr){
          totalPrice += item.eachAmount-0
        }
        billMain.totalPrice = 0-totalPrice
        billMain.changeAmount = 0-billMain.changeAmount
        if(this.fileList && this.fileList.length > 0) {
          billMain.fileName = this.fileList
        }
        if(this.model.id){
          billMain.id = this.model.id
        }
        return {
          info: JSON.stringify(billMain),
          rows: JSON.stringify(detailArr),
        }
      },
      handleClickAdd() {
        let organId = this.form.getFieldValue('organId')
        if(organId){
          this.$refs.debtBillList.show(organId, '入库', '采购', '供应商', "")
          this.$refs.debtBillList.title = "选择采购入库欠款单据"
        } else {
          this.$message.warning('请选择供应商！');
        }
      },
      handleClear() {
        this.accountTable.dataSource = []
      }
    }
  }
</script>
<style scoped>
  .action-button {
    margin-bottom: 8px;
  }
  .gap {
    padding-left: 8px;
  }
</style>